traffic congestion on I 87 Major Deegan Expressway northbound from Macombs Dam Bridge to I 95 starting 2:16 PM, 02 20 07 until further notice Original lanes: R2 Comment:  Delays beginning N B major D. Expwy at the Cross Bx. Expwy. entrance ramp.